
 cls-file Version 2.0
 GPS week: 1684   Day: 6   MJD: 56038                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brx |    96     0   2304      0       0       0      0      0      0      0      0      0  100.00
 brd |    96     0   2304      0  156910       0      0      0      0      0      0      0    0.00
 cod |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 emx |    96     0   2301      0  158062   -3789   4321   4321      0   7234   7234      0    0.00
 esx |    96     0   2304      0  160013   -6864   4321   4321      0   4478   4478      0    0.00
 gfz |    96     0   2304      0       0   -7009   4311   4311      0   7056   7056      0    0.00
 grg |    96     0   2304      0  164718   -6189   4309   4309      0  20403  20403      0    0.00
 iac |    96     0   2304      0  157729   -1511   4324   4324      0   7333   7333      0    0.00
 mcc |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc |
 -----+-------------------------------------------------------+
  101 |     0     0     - -3575   176 -3725  2964 -4148     - |
  102 |     0     0     -  3528 -1357  2933 -5422  4321     - |
  103 |     0     0     - 11039     5  9547 16163  7803     - |
  104 |     0     0     -  5033  -760  4798 14160  3496     - |
  105 |     0     0     -  -981   482 -1086 -5551 -1311     - |
  106 |     0     0     -  7112  -718  7888 19925 10245     - |
  107 |     0     0     -  1055   314   132   203 -1108     - |
  108 |     0     0     -  -116   336 -2279  3302 -5082     - |
  109 |     0     0     -  2220  2216  3395 44027  6374     - |
  110 |     0     0     - -3912   110 -2657-20562  1040     - |
  111 |     0     0     -  4371  1894  3760 -4436  4195     - |
  112 |     0     0     --11242 -2074-11259-10136-10359     - |
  113 |     0     0     -  4731   161  3715-11440  4218     - |
  114 |     0     0     - -4625  -793 -2798-10107   -82     - |
  115 |     0     0     - -5232   300 -4015-28881 -2124     - |
  116 |     0     0     -  2840 -1197  4198 20620  5322     - |
  117 |     0     0     -  3628  -120  4015-26882  1941     - |
  118 |     0     0     - -9802 -1316 -9130-20429 -8632     - |
  119 |     0     0     -  4635  -100  4280  -917  1260     - |
  120 |     0     0     --10154  1794-10205-37062-11454     - |
  121 |     0     0     - -1652  -260 -2516 22625 -5584     - |
  122 |     0     0     -  6613  1843  6470 39612  7531     - |
  123 |     0     0     - -6998  -514 -7063 -4651 -8744     - |
  124 |     0     0     -  1621  -421  1600  2875   883     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc | NEPO    RMS
 -----+-------------------------------------------------------+-------------
  101 |     0     0     -  1868  1814  1820  1858  1746     - |   96   1309
  102 |     0     0     -  1886  1989  1963  2011  1890     - |   96    715
  103 |     0     0     -  4004  3970  3967  3799  3918     - |   96   2096
  104 |     0     0     -   955   821   835   856   841     - |   96   1119
  105 |     0     0     -  3281  3308  3312  3225  3384     - |   96    906
  106 |     0     0     -  3742  3743  3760  3694  3733     - |   96   1258
  107 |     0     0     -  2441  2493  2476  2509  2504     - |   96   2134
  108 |     0     0     -  2865  2903  2915  2872  2868     - |   96    578
  109 |     0     0     -  4191  4206  4203  4189  4269     - |   96   3628
  110 |     0     0     -  2677  2696  2712  2738  2682     - |   96   2487
  111 |     0     0     -  3431  3361  3343  3366  3502     - |   96   3612
  112 |     0     0     -  5584  5636  5601  5588  5574     - |   96   5936
  113 |     0     0     -  2677  2698  2644  2560  2668     - |   96   1407
  114 |     0     0     -  3929  3943  3961  4016  3936     - |   96   4945
  115 |     0     0     - 10258 10206 10192 10030 10218     - |   96   3725
  116 |     0     0     -  5308  5308  5274  5237  5189     - |   96   4448
  117 |     0     0     -  2305  2355  2353  2333  2336     - |   96   2084
  118 |     0     0     -  5786  5749  5759  5841  5786     - |   96   3986
  119 |     0     0     -  1626  1608  1588  1728  1586     - |   96    589
  120 |     0     0     -  3933  3970  3950  3954  4037     - |   96   3531
  121 |     0     0     -  3321  3314  3283  3420  3273     - |   96   2797
  122 |     0     0     -  9083  9095  9072  9143  9140     - |   96   7559
  123 |     0     0     -  2722  2776  2760  2766  2781     - |   96   2314
  124 |     0     0     -  2893  2854  2844  3113  2911     - |   96   1586
 -----+-------------------------------------------------------+-------------
 TOT  |     0     0     -  4322  4322  4312  4309  4324     - |
