
 cls-file Version 2.0
 GPS week: 1684   Day: 5   MJD: 56037                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brx |    96     0   2304      0       0       0      0      0      0      0      0      0  100.00
 brd |    96     0   2304      0  154787       0      0      0      0      0      0      0    0.00
 cod |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 emx |    96     0   2303      0  158483   -8728   6268   6268      0   8996   8996      0    0.00
 esx |    96     0   2304      0  161405  -11636   6314   6314      0   6661   6661      0    0.00
 gfz |    96     0   2304      0       0  -10613   6316   6316      0   9006   9006      0    0.00
 grg |    96     0   2304      0  177064  -10129   6294   6294      0  29661  29661      0    0.00
 iac |    96     0   2304      0  153298     369   6342   6342      0   9340   9340      0    0.00
 mcc |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc |
 -----+-------------------------------------------------------+
  101 |     0     0     - -6846  -442 -7205 20249 -7650     - |
  102 |     0     0     -  4376  -651  3973  3983  5545     - |
  103 |     0     0     -  6583  -736  5347 18931  3275     - |
  104 |     0     0     -  2133  -137  2341 -3970   385     - |
  105 |     0     0     - -4121   392 -4407-48824 -4679     - |
  106 |     0     0     -   260   656  1272 -2164  3736     - |
  107 |     0     0     - -7877   159 -8593 -2217-10379     - |
  108 |     0     0     -   760  -270  -501 10436 -3947     - |
  109 |     0     0     -  5088  3159  6231 19787  9465     - |
  110 |     0     0     - -5811   504 -3446-18237   442     - |
  111 |     0     0     -  2705  1470  2508 -2873  2866     - |
  112 |     0     0     - -6328 -1544 -6637  5076 -5677     - |
  113 |     0     0     -  4619  -923  3633  8340  4264     - |
  114 |     0     0     --16693 -1644-15724-75268-12760     - |
  115 |     0     0     -  9021  -672 10128-58833 12124     - |
  116 |     0     0     -  3999  -710  5154 51371  6350     - |
  117 |     0     0     -   415 -1300     5-22705 -1817     - |
  118 |     0     0     -  3670  -170  4224 33883  5091     - |
  119 |     0     0     -  1839  -523  1089 -5712 -1938     - |
  120 |     0     0     - 12228  4605 11770  1330 11014     - |
  121 |     0     0     - -4656  -123 -5712 29160 -8714     - |
  122 |     0     0     -  -865  1676  -670 39750   326     - |
  123 |     0     0     - -7397 -1584 -7369 -7426 -9242     - |
  124 |     0     0     -  2916 -1195  2590  5932  1921     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc | NEPO    RMS
 -----+-------------------------------------------------------+-------------
  101 |     0     0     -  3195  3114  3019  3125  3111     - |   96   1186
  102 |     0     0     -  3878  3809  3850  3776  3884     - |   96   1094
  103 |     0     0     -  2573  2514  2454  2509  2650     - |   96   2344
  104 |     0     0     -  3374  3401  3353  3590  3441     - |   96   1308
  105 |     0     0     -  2997  3026  3024  2977  3113     - |   96   1444
  106 |     0     0     -  2899  2817  2835  2793  2752     - |   96   2201
  107 |     0     0     -  6006  6086  6028  6115  6137     - |   96   5862
  108 |     0     0     -  4227  4189  4230  4180  4191     - |   96   1095
  109 |     0     0     -  5078  5145  5114  5023  5223     - |   96   6087
  110 |     0     0     -  4713  4765  4783  4840  4681     - |   96   4108
  111 |     0     0     -  3812  3798  3772  3794  3897     - |   96   3750
  112 |     0     0     -  6797  6805  6793  6773  6742     - |   96   7338
  113 |     0     0     -  3751  3743  3713  3717  3743     - |   96   3455
  114 |     0     0     -  7887  7818  7825  7706  7775     - |   96   2565
  115 |     0     0     -  4292  4278  4253  4200  4341     - |   96   3555
  116 |     0     0     -  3959  4055  4122  3898  3609     - |   96   2754
  117 |     0     0     -  3357  3456  3458  3451  3459     - |   96   2316
  118 |     0     0     -  2812  2791  2768  2818  2888     - |   96   3437
  119 |     0     0     -  2524  2496  2465  2691  2459     - |   96    639
  120 |     0     0     - 22742 23047 23109 22981 23256     - |   96  12005
  121 |     0     0     -  4045  4107  4105  4040  4004     - |   96   5133
  122 |     0     0     -  6031  6079  6061  6081  6104     - |   96   5576
  123 |     0     0     -  4516  4422  4381  4455  4435     - |   96   1526
  124 |     0     0     -  1736  1704  1710  1725  1763     - |   96    972
 -----+-------------------------------------------------------+-------------
 TOT  |     0     0     -  6268  6314  6316  6295  6342     - |
