
 cls-file Version 2.0
 GPS week: 1684   Day: 4   MJD: 56036                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brx |    96     0   2304      0       0       0      0      0      0      0      0      0  100.00
 brd |    96     0   2304      0  152249       0      0      0      0      0      0      0    0.00
 cod |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 emx |    96     0   2300      0  157202  -10665   5731   5731      0  10061  10061      0    0.00
 esx |    96     0   2304      0  159111  -14896   5719   5719      0   6105   6105      0    0.00
 gfz |    96     0   2303      0       0  -16084   5710   5710      0   9921   9921      0    0.00
 grg |    96     0   2304      0  150828  -16204   5712   5712      0  19251  19251      0    0.00
 iac |    96     0   2304      0  156023   -2329   5722   5722      0   9930   9930      0    0.00
 mcc |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc |
 -----+-------------------------------------------------------+
  101 |     0     0     - -5069 -2536 -5183-18048 -5769     - |
  102 |     0     0     -  1950 -1419  1829 -3090  3312     - |
  103 |     0     0     -   350   672  -241 -5255 -2032     - |
  104 |     0     0     -   247   607    94-25502 -1493     - |
  105 |     0     0     -  4805 -1323  4809-13872  4597     - |
  106 |     0     0     -  8024   747  8515 18362 10918     - |
  107 |     0     0     -  1343 -1119   911 20828  -609     - |
  108 |     0     0     -   483 -2611 -1443 11116 -4393     - |
  109 |     0     0     -  9080  2539  9779 17389 12991     - |
  110 |     0     0     - -3204 -1321 -2476-28079  1091     - |
  111 |     0     0     -   768  1722   598 -1056   702     - |
  112 |     0     0     --10550  -370-10921 -4736-10063     - |
  113 |     0     0     -   394  -455  -670-12085   287     - |
  114 |     0     0     --16754    39-15366-13965-12911     - |
  115 |     0     0     --16886  5935-16048-23399-14132     - |
  116 |     0     0     - -5762   203 -4828  5983 -3673     - |
  117 |     0     0     - -1743 -1999 -1883-15401 -3686     - |
  118 |     0     0     - 10236   -46 10767  7331 11690     - |
  119 |     0     0     -  3173   237  2256  6230  -628     - |
  120 |     0     0     - 24171   930 23582 34435 22701     - |
  121 |     0     0     -  1585  1442   681 21299 -2331     - |
  122 |     0     0     - -1280  2510 -1194 41316  -307     - |
  123 |     0     0     - -3605 -2185 -3026 -3558 -4973     - |
  124 |     0     0     -  -700 -2201  -498-16246 -1290     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc | NEPO    RMS
 -----+-------------------------------------------------------+-------------
  101 |     0     0     -  4535  4518  4584  4606  4628     - |   96   2975
  102 |     0     0     -  3042  3024  3022  3015  2981     - |   96   2583
  103 |     0     0     -  2660  2676  2663  2594  2670     - |   96   2260
  104 |     0     0     -  2290  2305  2270  2284  2272     - |   96   2390
  105 |     0     0     -  9498  9412  9384  9340  9468     - |   96   6364
  106 |     0     0     -  2296  2384  2401  2296  2332     - |   96   2757
  107 |     0     0     -  2116  2098  2092  2075  2080     - |   96   1800
  108 |     0     0     -  5618  5639  5650  5660  5633     - |   96   5280
  109 |     0     0     -  3818  3779  3772  3704  3860     - |   96   3875
  110 |     0     0     -  5403  5359  5381  5305  5277     - |   96   4529
  111 |     0     0     -  3665  3527  3479  3578  3640     - |   96   2535
  112 |     0     0     -  7541  7575  7566  7573  7496     - |   96   7364
  113 |     0     0     -  2531  2546  2503  2543  2562     - |   96   3155
  114 |     0     0     -  4727  4827  4842  4808  4765     - |   96   4011
  115 |     0     0     - 15050 15140 15146 15167 15237     - |   96   7828
  116 |     0     0     -  4632  4644  4620  4649  4641     - |   96   4667
  117 |     0     0     -  3267  3171  3180  3136  3130     - |   96   3437
  118 |     0     0     -  6924  6908  6916  6925  6995     - |   96   5710
  119 |     0     0     -  3678  3675  3692  3645  3675     - |   96   3688
  120 |     0     0     -  9498  9193  9097  9170  9012     - |   96   2758
  121 |     0     0     -  5137  5088  5089  5068  5082     - |   96   4886
  122 |     0     0     -  5859  5846  5841  5881  5876     - |   96   5420
  123 |     0     0     -  2414  2431  2434  2441  2411     - |   96   2568
  124 |     0     0     -  2423  2375  2402  2396  2368     - |   96   2345
 -----+-------------------------------------------------------+-------------
 TOT  |     0     0     -  5732  5719  5711  5713  5722     - |
