
 cls-file Version 2.0
 GPS week: 1684   Day: 3   MJD: 56035                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brx |    96     0   2304      0       0       0      0      0      0      0      0      0  100.00
 brd |    96     0   2304      0  160620       0      0      0      0      0      0      0    0.00
 cod |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 emx |    96     0   2303      0  161316   -1838   3685   3685      0   6362   6362      0    0.00
 esx |    96     0   2304      3  159418     238   3605   3605      0   3779   3779      0    0.00
 gfz |    96     0   2304      0       0   -1538   3674   3674      0   6146   6146      0    0.00
 grg |    96     0   2304      0  155411   -1679   3698   3698      0  17883  17883      0    0.00
 iac |    96     0   2304      0  163411    -479   3669   3669      0   6141   6141      0    0.00
 mcc |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc |
 -----+-------------------------------------------------------+
  101 |     0     0     - -2259  -440 -2623-27188 -3086     - |
  102 |     0     0     -  2770  -218  2342 -6745  3847     - |
  103 |     0     0     -  4645   284  3406    15  1685     - |
  104 |     0     0     - -1137   738 -1955-22385 -3127     - |
  105 |     0     0     -  3739   455  4024  1715  3672     - |
  106 |     0     0     -  4237  -228  5155 26218  7631     - |
  107 |     0     0     -  1278  -543   544 23954  -857     - |
  108 |     0     0     -     4  -364 -2685  2824 -5243     - |
  109 |     0     0     - 11612  1044 12689-28321 15557     - |
  110 |     0     0     - -9131  -292 -8212-18683 -4754     - |
  111 |     0     0     - -3282   599 -3419-11051 -3212     - |
  112 |     0     0     - -1959 -2492 -1948  8810  -977     - |
  113 |     0     0     -  1798  -164  1097  3377  1515     - |
  114 |     0     0     - -7597   157 -4880   699 -2414     - |
  115 |     0     0     - -9263  2745 -8033-31047 -6046     - |
  116 |     0     0     - -6493 -1222 -5468  1892 -4366     - |
  117 |     0     0     -   878  -638   886-14330 -1080     - |
  118 |     0     0     -  -251  1444   413 21382  1263     - |
  119 |     0     0     -  -127    70 -1042 25569 -3845     - |
  120 |     0     0     -  6589   495  6170 14512  5199     - |
  121 |     0     0     -  8746  -468  8166 20627  4946     - |
  122 |     0     0     - -4232   452 -4515 19399 -3750     - |
  123 |     0     0     - -2417  -812 -2018  -117 -3790     - |
  124 |     0     0     -  1822  -733  1906-11127  1232     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc | NEPO    RMS
 -----+-------------------------------------------------------+-------------
  101 |     0     0     -  1800  1764  1802  1848  1884     - |   96   1551
  102 |     0     0     -  3119  3091  3067  3055  3102     - |   96   1970
  103 |     0     0     -  2015  2021  1998  2095  1958     - |   96   2310
  104 |     0     0     -  2545  2560  2544  2600  2529     - |   96   1554
  105 |     0     0     -  3603  3681  3680  3789  3629     - |   96   1253
  106 |     0     0     -  1768  1735  1792  1762  1782     - |   96   1421
  107 |     0     0     -  2798  2778  2781  2828  2857     - |   96   2309
  108 |     0     0     -  1547  1528  1545  1620  1581     - |   96    996
  109 |     0     0     -  3179  3210  3165  3145  3254     - |   96   3437
  110 |     0     0     -  4740  4756  4726  4737  4687     - |   96   3689
  111 |     0     0     -  4451  4256  4312  4402  4446     - |   96   3506
  112 |     0     0     -  7700  7739  7692  7707  7646     - |   96   7475
  113 |     0     0     -  1537  1559  1491  1509  1540     - |   96   1386
  114 |     0     0     -  3691  3706  3654  3686  3632     - |   96   3399
  115 |     0     0     -  7449  6649  7461  7574  7351     - |   96   4760
  116 |     0     0     -  3640  3646  3667  3615  3646     - |   96   3454
  117 |     0     0     -  2217  2258  2233  2180  2239     - |   96   1771
  118 |     0     0     -  3554  3534  3519  3575  3550     - |   96   4280
  119 |     0     0     -   969   978   992   978  1018     - |   96    943
  120 |     0     0     -  4152  4006  4132  4083  4064     - |   96   2480
  121 |     0     0     -  2487  2485  2488  2474  2489     - |   96   3222
  122 |     0     0     -  5684  5697  5650  5658  5678     - |   96   5050
  123 |     0     0     -  1478  1446  1530  1521  1496     - |   96   1193
  124 |     0     0     -  2619  2554  2616  2609  2598     - |   96   2379
 -----+-------------------------------------------------------+-------------
 TOT  |     0     0     -  3686  3606  3675  3699  3670     - |
