
 cls-file Version 2.0
 GPS week: 1684   Day: 0   MJD: 56032                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brx |    96     0   2304      0       0       0      0      0      0      0      0      0  100.00
 brd |    96     0   2304      0  165130       0      0      0      0      0      0      0    0.00
 cod |     0     0      0      0       0       0      0      0      0      0      0      0    0.00
 emx |    96     0   2304      0  164978    -585   3641   3641      0   6555   6555      0    0.00
 esx |    96     0   2304      0  167584   -4387   3634   3634      0   3882   3882      0    0.00
 gfz |    96     0   2304      0       0   -2499   3636   3636      0   6497   6497      0    0.00
 grg |    96     0   2304      0  157660   -2120   3642   3642      0  18231  18231      0    0.00
 iac |    96     0   2304      0  166374    -495   3654   3654      0   7201   7201      0    0.00
 mcc |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc |
 -----+-------------------------------------------------------+
  101 |     0     0     - -7401   991 -7431-38088 -8120     - |
  102 |     0     0     -  3734  -340  3425 13083  4831     - |
  103 |     0     0     -  2609  -682  2043 27885   206     - |
  104 |     0     0     -  3324  -907  2726-16788  1442     - |
  105 |     0     0     -  -934  -957 -1278 -5234 -1592     - |
  106 |     0     0     -  6621  -686  7230 16110  9616     - |
  107 |     0     0     - -5087   251 -5460 -6486 -6899     - |
  108 |     0     0     -   663   918 -1775-19233 -4424     - |
  109 |     0     0     -  2663  1720  3573 10422  6805     - |
  110 |     0     0     -  1051  -295  2154  9189  5782     - |
  111 |     0     0     - -4121  2102 -3783  8448 -3802     - |
  112 |     0     0     - -1898 -1999 -2204  -623 -1369     - |
  113 |     0     0     -  8565  -785  7959 15283  8673     - |
  114 |     0     0     - -8228 -1802 -5536  5543 -3169     - |
  115 |     0     0     - -2290  2315 -1415-18869   490     - |
  116 |     0     0     -   381 -1102  1332-26986  2528     - |
  117 |     0     0     -  3094    48  2361  1621   767     - |
  118 |     0     0     - -8209   596 -8057 10259 -7115     - |
  119 |     0     0     -  2149  -824  1527  7679 -1415     - |
  120 |     0     0     -   373  -309   348 -2022  -925     - |
  121 |     0     0     - -6254 -1302 -7049-26916-10062     - |
  122 |     0     0     - 14470  2573 14871 41686 15766     - |
  123 |     0     0     - -6350   221 -6566 -1215 -8385     - |
  124 |     0     0     -  1078   255  1003 -4747   371     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brx   brd   cod   emx   esx   gfz   grg   iac   mcc | NEPO    RMS
 -----+-------------------------------------------------------+-------------
  101 |     0     0     -  2215  2187  2193  2043  2208     - |   96   1062
  102 |     0     0     -  2422  2414  2396  2381  2446     - |   96   1252
  103 |     0     0     -  3044  3004  2944  2981  2906     - |   96   2248
  104 |     0     0     -  1787  1826  1836  1755  1823     - |   96   1283
  105 |     0     0     -  1110  1133  1117  1178  1145     - |   96    810
  106 |     0     0     -  3273  3301  3291  3312  3260     - |   96   1863
  107 |     0     0     -  2562  2549  2574  2611  2530     - |   96   2260
  108 |     0     0     -  2498  2477  2481  2504  2503     - |   96    876
  109 |     0     0     -  3738  3711  3706  3720  3788     - |   96   3972
  110 |     0     0     -  3986  3956  3934  3913  3930     - |   96   3341
  111 |     0     0     -  3467  3438  3430  3368  3537     - |   96   2929
  112 |     0     0     -  4293  4264  4247  4399  4219     - |   96   5024
  113 |     0     0     -  2184  2136  2120  1959  2200     - |   96   1652
  114 |     0     0     -  3385  3407  3438  3351  3385     - |   96   3638
  115 |     0     0     -  6152  6171  6127  6154  6153     - |   96   3589
  116 |     0     0     -  4074  4127  4157  4157  4102     - |   96   3683
  117 |     0     0     -  2249  2198  2231  2220  2177     - |   96   1680
  118 |     0     0     -  7625  7611  7621  7703  7681     - |   96   4336
  119 |     0     0     -  1027  1014  1026  1048  1027     - |   96    505
  120 |     0     0     -  5032  5007  5042  5195  5178     - |   96   2457
  121 |     0     0     -  2694  2751  2777  2702  2688     - |   96   3498
  122 |     0     0     -  6090  6086  6118  6031  6195     - |   96   4784
  123 |     0     0     -  2562  2508  2482  2525  2498     - |   96    864
  124 |     0     0     -  1471  1470  1497  1452  1471     - |   96   1470
 -----+-------------------------------------------------------+-------------
 TOT  |     0     0     -  3641  3635  3636  3643  3655     - |
